MSI released the fanless Wind Top AE1941 all-in-one PC

MSI has released a brand new all-in-one PC system, the Wind Top AE 1941 which basically covered the necessities and focused on energy efficiency and space saving. The AE1941 features white color and crystal frame design. It comes with the ULV (Ultra Low Voltage) CPUs and the unique Fanless design, which is an industry first.

Features of the AE1941:

Low Power Consumption Intel Mobile Platform

The AE1941 is equipped with Intel Celeron 847 ULV 1.1GHz dual-core processor, which features low power consumption and requiring only 17W TDP to operate. This is much lower compared to the average desktop.

Fanless design

The Wind Top AE1941 adopts fanless design for superior heat dissipation, noise exclusion and low power consumption in terms of better user experience. Fanless design does also reduce downtime as well as increase the life cycle of the All-in-One PC.[more…]
Anti-Glare Display

The Wind Top AE1941 uses the Anti-Glare Single-Touch Panel which greatly reduces the light reflection from the surface of the screen to protect your eyes and increase the clarity of the display.

LED Backlight

The adoption of LED panel for All-in-One PCs makes it possible to create ultra-slim PC designs, while also enabling users to benefit from LED displays’ low energy consumption. The LED panel provides energy savings of approximately 30% compared to conventional CCFL panels. Combining this advantage with MSI’s unique energy-saving technologies.

Specifications:

CPU | Intel® Celeron® 847 Processor
OS | Windows 7 Home Premium 64 bit (MSI recommends upgrade to Windows 7 Professional)
Chipset | Intel® NM70 Chipset
Memory | 4GB DDR3 1333 / DDR3 SO-DIMM x 1 slots / Max. to 4GB
Graphics | Intel® HD Graphics
Panel Resolution | 18.5’’ LCD Panel LED Backlight (1366*768 )
Touch Panel | Single-touch (Optional)
HDD | 2.5” SATA III 320GB
Optical Drive | Tray-in DVD Super Multi
Audio | 2 x 3W Speakers with SRS Premium Sound
LAN | 10/100/1000 x 1
Wireless LAN | 802.11 b/g/n WiFi
USB 2.0 port | 4
Card Reader | 3 in 1 (SD, MMC, MS)
Webcam | 1.0 megapixel webcam and microphone
Expansion Slot | Mini PCI-E 1x (1xWiFi)
Mic-in/Headphone-out | 1 /1
Keyboard / Mouse | USB Keyboard / Mouse
AC Adapter | 65W
Dimension(WxDxH) | 476mm * 49 mm * 365mm
Net Weight | 7.5 kg
Gross Weight | 8.48 kg

Read more:
http://www.msi.com/product/aio/Wind-Top-AE1941.html#/?div=Overview

The post MSI released the fanless Wind Top AE1941 all-in-one PC appeared first on Malaysia IT Fair.